\begin{thebibliography}{1}

\bibitem{astrom96}
K.~J. {\AA}str{\"{o}}m and T.~H{\"{a}}gglund.
\newblock {PID} {C}ontrol.
\newblock In W.~S. Levine, editor, {\em The Control Handbook}, chapter 10.5,
  pages 198--209. CRC Press in cooperation with IEEE Press, Boca Raton, Florida
  33431, 1996.

\bibitem{bennett93}
S.~Bennett.
\newblock Development of the {PID} controller.
\newblock {\em IEEE Conrol Systems Magazine}, 13(6):58--65, December 1993.

\bibitem{knospe06}
C.~Knospe.
\newblock {PID} control---{I}ntroduction to the special section.
\newblock {\em IEEE Conrol Systems Magazine}, 26(1):30--31, February 2006.

\bibitem{li06}
Y.~Li, K.~H. Ang, and G.~C.~Y. Chong.
\newblock {PID} control system analysis and design: {P}roblems, remedies, and
  future directions.
\newblock {\em IEEE Conrol Systems Magazine}, 26(1):32--41, February 2006.

\bibitem{ogata97}
K.~Ogata.
\newblock {\em Modern Control Engineering}.
\newblock Prentice Hall, Upper Saddle River, New Jersey 07458, third edition,
  1997.

\bibitem{ogata97sm}
K.~Ogata.
\newblock {\em Solutions Manual to Modern Control Engineering}.
\newblock Prentice Hall, Upper Saddle River, New Jersey 07458, third edition,
  1997.

\bibitem{wolovich94}
W.~A. Wolovich.
\newblock {\em Automatic Control Systems{:} Basic Analysis and Design}.
\newblock Saunders College Publishing, Harcourt Brace College Publishers, Fort
  Worth, 1994.

\bibitem{ziegler42}
J.~G. Ziegler and N.~B. Nichols.
\newblock Optimum settings for automatic controllers.
\newblock {\em Transactions of the American Society of Mechanical Engineers},
  64:759--768, November 1942.

\end{thebibliography}
