\begin{thebibliography}{1}

\bibitem{bakker85}
G.~J. Bakker and H.~Nijmeijer.
\newblock Comments on {`C}ontrol design for multivariable non-linear
  time-varying systems{'}.
\newblock {\em Int. J. Control}, 41(6):1627--1629, 1985.

\bibitem{bestle83}
D.~Bestle and M.~Zeitz.
\newblock Canonical form observer design for non-linear time-variable systems.
\newblock {\em Int. J. Control}, 38(2):419--431, 1983.

\bibitem{friedland96}
B.~Friedland.
\newblock {\em Advanced Control System Design}.
\newblock Prentice-Hall, Englewood Cliffs, New Jersey 07632, 1996.

\bibitem{hunt83}
L.~R. Hunt, R.~Su, and G.~Meyer.
\newblock Global transformations of nonlinear systems.
\newblock {\em IEEE Transactions on Automatic Control}, AC-28(1):24--31,
  January 1983.

\bibitem{sommer80}
R.~Sommer.
\newblock Control design for multivariable non-linear time-varying systems.
\newblock {\em Int. J. Control}, 31(5):883--891, 1980.

\bibitem{su82}
R.~Su.
\newblock On the linear equivalents of nonlinear systems.
\newblock {\em Systems \& Control Letters}, 2(1):48--52, July 1982.

\bibitem{walcott87b}
B.~L. Walcott, M.~J. Corless, and S.~H. {\.{Z}}ak.
\newblock Comparative study of non-linear state-observation techniques.
\newblock {\em Int. J. Control}, 45(6):2109--2132, 1987.

\bibitem{zak86}
S.~H. {\.{Z}}ak and C.~A. Ma{cC}arley.
\newblock State-feedback control of non-linear systems.
\newblock {\em Int. J. Control}, 43(5):1497--1514, 1986.

\bibitem{zeitz87}
M.~Zeitz.
\newblock Comments on {`C}omparative study of non-linear state-observation
  techniques{'}.
\newblock {\em Int. J. Control}, 46(5):1861--1863, 1987.

\end{thebibliography}
